en-us	The automatic clean up operation for log only copy ' \ ' will not be run because the database has insufficient redundancy. Actual : , Expected :

en-us	Clean up of log only copy ' \ ' will not be attempted because the variant config setting EnableLogOnlyCopyCleanup is set to false.